GREY: G24.8+0. IPOL 613.283 MHZ G24CH0.PBCOR.1

PLot file version 2 created 02-MAR-2007 10:21:27

Grey scale flux range= 2.00 20.00 MilliJY/BEAM 5 10 15 20

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

18 37 15 00 36 45 30 15 00 35 45

-07 0510152025 142Jy143Jy < 746Jy< 1097Jy < 1322Jy 473Jy

256Jy 37Jy326Jy 28Jy 1322Jy 91Jy

485Jy

93Jy 91Jy 56Jy