0 50 100 150 200 250 300 350 0

0.2

0.4

0.6

0.8

1

1.2

1.4

1.6

1.8

Time step number (each step 0.25 seconds)

Amplitude (arbitrary Units)

On Source Virgo A (M 87)

Off Source

GMRT 4-m dish 1420 MHz Continuum observation 19 April 2005, 09:09 UTC

Source : Virgo A Flux Density = 220 Jy +- 9 Jy at 1400 MHz

RMS Noise = 0.008 units